X-Git-Url: https://svn.cri.mines-paristech.fr/git/pipstransfo.git/blobdiff_plain/6ffc144e063c3bd45b367345e9b4e37a13055662..625670968322617fed9df3a0ec370faa3185f167:/pipstransfo.tex?ds=inline

diff --git a/pipstransfo.tex b/pipstransfo.tex
index e3046b8..4706900 100644
--- a/pipstransfo.tex
+++ b/pipstransfo.tex
@@ -3,6 +3,7 @@
 \usepackage[utf8]{inputenc}
 \usepackage[T1]{fontenc}
 \usepackage[english]{babel}
+\usepackage{lmodern}
 
 \usepackage{listings}
 \usepackage{hyperref}
@@ -115,8 +116,7 @@
   are private to a loop body, i.e.\ written first, then read.}
 
 \item[loop normalization]{is a loop transformation that changes
-  the loop initial increment value or the loop range to enforce certain values, generally
-  1.}
+  the loop initial increment value or the loop range to enforce certain values, generally~1.}
 
 \item[iteration clamping]{is a loop transformation that extends
   the loop range but guards the loop body with the former range.}
