X-Git-Url: https://svn.cri.mines-paristech.fr/git/Faustine.git/blobdiff_plain/1059e1cc0c2ecfa237406949aa26155b6a5b9154..66f23d4fabf89ad09adbd4dfc15ac6b5b2b7da83:/interpretor/lib/src/libsndfile-1.0.25/tests/floating_point_test.def

diff --git a/interpretor/lib/src/libsndfile-1.0.25/tests/floating_point_test.def b/interpretor/lib/src/libsndfile-1.0.25/tests/floating_point_test.def
deleted file mode 100644
index 3441d34..0000000
--- a/interpretor/lib/src/libsndfile-1.0.25/tests/floating_point_test.def
+++ /dev/null
@@ -1,32 +0,0 @@
-autogen definitions floating_point_test.tpl;
-
-endian_type = {
-	end_name		= little ;
-	end_type		= SF_ENDIAN_LITTLE ;
-	} ;
-
-endian_type = {
-	end_name		= big ;
-	end_type		= SF_ENDIAN_BIG ;
-	} ;
-
-float_type = {
-	float_name		= float ;
-	minor_type		= SF_FORMAT_FLOAT ;
-	} ;
-
-float_type = {
-	float_name		= double ;
-	minor_type		= SF_FORMAT_DOUBLE ;
-	} ;
-
-int_type = {
-	int_name		= short ;
-	int_max			= 0x7FFF ;
-	} ;
-
-int_type = {
-	int_name		= int ;
-	int_max			= 0x7FFFFFFF ;
-	} ;
-
